TITLEDRAWINGNUMBERDATEDRAWNBYSCALEUniversity of CaliforniaIGPP 0225La Jolla, California 92093

Do Not Scale This DrawingDESIGN 3 GPS Ant. MountCBH8 Sep, 98AD3-101CrossSection

1" = 1"Tolerances +/- (unless specified) x/x .x .xx .xxx angular1/64" .1" .01" .005" 1degAntenna2 BellevilleWashers PlasticDome BaseMonument PipeAD3-011CouplingWeld entirecircumference, avoid clamping boltTack WeldAnti-tamperScrewsAD3-004CenterSupportBoltAD3-002BottomPlateAD3-001TopPlateAD3-005Security Set Screw3/32" max protrusion (use Loctite)AD3-003AntennaBoltAD3-004ClampingBoltAD3-005LevelingScrew #1

(Hole not shown in true perspective)

AD3-005LockingSet Screw

1.36"

2.34"R.

.250" nom.

Tack Weldin one spot